Title: How to load cold chain equipment
Course: Immunization - Ethiopia (Full)

How to load cold chain equipment

Refrigerators, cold boxes and vaccine carriers must be loaded correctly to keep the temperature of the vaccines and diluents inside within the acceptable range. All health workers in a Health Post should know how to monitor the cold chain equipment and what action to take if the temperature is too high or too low.