Title: Learning Outcomes
Course: Immunization - Ethiopia (Full)

When you have studied this session, you should be able to:

- Define and use correctly all of the key words printed in bold.
- Describe the common types of cold chain equipment and their uses in your Health Post.
- Describe how you can monitor the effectiveness of the cold chain for vaccines at your Health Post and when you are transporting vaccines.
- Describe how vaccines can be spoiled and how to prevent this from happening.
- Describe how to load vaccines and diluents correctly into cold chain equipment.
- Briefly describe how to maintain cold chain equipment (undertake minor repairs).