Title: Effectiveness of pentavalent vaccine
Course: Immunization - Ethiopia (Full)

Effectiveness of pentavalent vaccine

On average, 78–95% of individuals who have received three vaccine doses will normally be protected against all five diseases covered by the pentavalent vaccine. This means that in every 100 people who receive three doses, on average, between 78–95 of these individuals will be protected against all five diseases.