Title: Learning Outcomes
Course: Health Management, Ethics and Research - Ethiopia (Full)

When you have studied this session, you should be able to:

- Define and use correctly all of the key words printed in bold.
- Describe the actions you would take to maintain essential Health Post equipment and prevent breakdowns.
- Describe how you would manage Health Post stores in order to maintain essential health services in your community and reduce wastage.
- Explain how you would estimate quantities of drugs and other consumable supplies on the basis of rates of use.
- Explain why it is important to educate Health Post staff, volunteers, patients and parents about the correct use of drugs and other consumable supplies issued to them.