Title: Management of equipment
Course: Health Management, Ethics and Research - Ethiopia (Full)

Management of equipment

As a Level-IV Health Extension Practitioner you will be involved in the maintenance of non-consumable equipment in the Health Post, i.e. keeping it in good working condition. What skills do you need in order to fulfil this responsibility?