Title: Treatment of infertility
Course: Family Planning - Ethiopia (Full)

Treatment of infertility

There is no universal treatment or cure for infertility. Any treatment depends on the specific causes of infertility for a couple. The majority of couples who seek advice, testing and treatment for infertility might conceive within 12 to 18 months following investigation. Usually, you would expect to counsel a couple after having identified the causes or risk factors you think may have contributed to the couple being infertile.