Title: Sino-implant
Course: Family Planning - Ethiopia (Full)

Sino-implant

Sino-implant is another contraceptive implant of two rods prepared from progestin, and is similar to Jadelle. It is effective for five years. It was introduced after Implanon and is available in Ethiopia, but at the time of writing it has not been approved by the Ministry of Health for use in Ethiopia.