Title: Effectiveness
Course: Family Planning - Ethiopia (Full)

Effectiveness

The diaphragm has a relatively high failure rate, about 16% over the first year of use. However, it is considered a good choice by women whose health or lifestyle prevents them from using more effective hormonal contraceptives.