Title: Disadvantages
Course: Family Planning - Ethiopia (Full)

Disadvantages

Natural family planning methods are unreliable in preventing unwanted pregnancy. It takes time to practise and use them properly, which adds to their unreliability. Additionally, natural family planning methods do not protect against sexually transmitted infections (STIs), including the human immunodeficiency virus (HIV). You should advise couples to use condoms to protect against STIs.