Title: Preparing to give an injection
Course: Communicable Diseases Part 3 - Ethiopia (Full)

Preparing to give an injection

Using a new sterile syringe and needle for each injection is one of the most effective ways to prevent the spread of blood-borne infections.

- Use a new packaged sterile syringe and needle for every injection.
- Inspect the packaging very carefully. Discard a needle or syringe if the package has been punctured, torn or damaged in any way.
- Check the expiry date on the package. Never use needles or associated injection materials that are 'out of date'.
- Prepare injections in a clean designated area or on a clean surface; in a patient's home you will need to use a clean dish or tray that you have washed in soap and water, left to air dry and then swabbed with alcohol before laying out the injection equipment.
- Prepare each dose immediately before administering; do not prepare several syringes in advance.
- Do not touch the needle. Discard a needle that has touched a non-sterile surface.