Title: Larvae
Course: Communicable Diseases Part 1 - Ethiopia (Full)

Larvae

The culicine larva has a breathing tube (siphon) which it also uses to hang down from the water surface, whereas the anopheline larva has no siphon and rests parallel to and immediately below the surface.