Title: Timing of spray operation
Course: Communicable Diseases Part 1 - Ethiopia (Full)

Timing of spray operation

In areas where malaria transmission is seasonal, IRS should be completed just before the season begins. Generally, only one round of spraying is done per year in Ethiopia. In areas where the main transmission season is from September to late November, spraying must be completed in August at the latest. For areas with a different malaria transmission pattern, the timing of spraying should be adjusted in consultation with malaria experts at the District Health Office.